Measurements of CP and T Violation Parameters

in the Neutral Kaon System at CPLEAR

The CPLEAR Collaboration

Saclay Orsay Marseille

LiverpoolAthens Ioannina Thessaloniki

Delft Coimbra Ljubljana

Stockholm Basel

ETHZ Fribourg PSI Boston

ß 100 physicists